we have never used birth control and God has bless...

we have never used birth control and God has blessed us with 5 children we have held and 2 we have not.

the language used is very stout. abortion is a harsh word and used in the medical world in regards to a miscarriage (spontaneous abortion). i'm not sure if i agree or not but i do know that God has blessed our quiver and closed down shop all on His own without any help one way or another from us.

i would also say that God is bigger than our attempts at birth control.

hmmm...i am going to have to chew on this one a bit, laurie. thanks!